14.4 14.6 14.8 15 15.2 15.4 15.6 15.8 16 6

8

10

12

14

16

18

20

1 2 34 56 7

8 9 10

11

1213 14 15 16

17

18

19 20 2122 23 24

25

26

27

28 29 3031 32 33

34

35

36

37

38

394041 42

43

44

45

46

47

4849 50 51 52

53

54

55

56

575859 60 61

62

63

64

65

6667 6869 70

71 72 73

74

7576 7778 79

80 81 8283

8485 8687 88

89 90 1 234 56 7

8 9 10

11

1213 1415 16

17

18

19 20 2122 23 24 26

27

28 29 3031 32 33 34 35

36

3738394041 42 43

44

45

46 47 484950 51 52

53

54

55 56 575859 61

62

63

64

65

66676869 70

71 72 73

74

7576 7778

80 81 828384858687 88

89 90

Logged Bias Values

Logged Variance Values nasa93_center_5 Bias-Variance Plots for 102 Methods. Dotted squares are for 3Way and dashed squares are for LOO.