To demonstrate the current state of the {\W}2 system, we ran a series of trials comprised of tests similar to the ones performed previously, as well as several tests designed to reveal more information about the way {\W}2 performs across a wider variety of datasets and settings.

\input{fig1.tex}

\input{fig2.tex}

\subsection{Basic Testing}

In order to establish a frame of reference against which to compare any subsequent results, we began by running {\W}2 through a series of tests similar to what had been published before. The results in \fig{ nasa93x30} can be said to be similar to what has been obtained previously. More specifically the osp and osp2 results were numerically very close. 
The table shows the median values of the 30 runs for both median reduction as well as spread reduction followed by a box plot showing the first quartile, median, and third quartile of the median reduction values.
Additionally, we explored the same 4 dataset/project combinations collecting information from 60 trials as opposed to just 30, in order to get an idea of weather increasing the number of runs could stabilize the results, shown in \fig{ nasa93x60}.
